\documentclass[a4paper,10pt]{article}
\usepackage[a4paper,margin=0.5in]{geometry}
\usepackage{enumitem}
\usepackage{tabularx}
\usepackage{hyperref}
\usepackage{changepage}
\usepackage{tikz}

\pagestyle{empty}


\newcommand{\work}[6]{
	{
		\vspace{1.25mm}
		\noindent
		\begin{tabular*}{\textwidth}{@{\extracolsep{\fill}} l r}
			\textbf{#1} & #2 \\
		\end{tabular*}
		\vspace{-5mm}
		#3 \hfill #4 \\
		
		% --- Description block (only renders if non-empty) ---
		\if\relax\detokenize{#5}\relax
		\else
		
			\vspace{-1.15mm}
			\begin{list}{}{\leftmargin=0mm \rightmargin=0mm}
				\item {\fontsize{10}{11}\selectfont \textit{#5}}
			\end{list}
			\vspace{-4mm}
		
		\fi
		
		\begin{itemize}
			\setlength{\itemsep}{-1mm}
			\setlength{\topsep}{0mm}
			\setlength{\parsep}{0mm}
			#6
		\end{itemize}
	}
}

\newcommand{\certification}[3]{
	{
		\vspace{1.5mm}
		\noindent
		\begin{tabular*}{\textwidth}{@{\extracolsep{\fill}} l r}
			\textbf{#1} & #3 \\
			\textit{#2}
		\end{tabular*}
	}
}

\begin{document}
	\begin{center}
		\vspace{-2.05mm}
		{\huge \bfseries Jacob Mattie} \\[0.75em]
		Vancouver $|$ 778-710-7554 $|$ 
		\href{mailto:jacob@qimbet.com}{jacob@qimbet.com} \\
		[0.15em]
		
		\href{https://github.com/qimbet}{github.com/qimbet} $|$ 
		\href{https://www.linkedin.com/in/qimbet/}{linkedin.com/in/qimbet/}  $|$
		\href{www.qimbet.com}{qimbet.com}
		

		\noindent\rule{\textwidth}{0.4pt}

		\vspace{2.05mm}

		Building and operating \textbf{distributed software} and \textbf{embedded systems} that interface with sensors, devices, and \textbf{industrial control} hardware in production environments.
		
		
		\vspace{1em}
		
		\noindent
		


		
		\begin{tabularx}{\linewidth}{@{}X|X|X|X@{}}
			
			\textbf{\underline{Controls \& Embedded}} &
			\textbf{\underline{Data \& Telemetry}} &
			\textbf{\underline{Distributed Backend}} &
			\textbf{\underline{Infrastructure \& Ops}} \\
			
			
			{\small
				\begin{tabular}{@{}l@{}}
					Docker \\
					\textbf{EPICS} \\
					ESP32 \\
					JavaScript	\\
					MATLAB \\
					\textbf{PLC} Systems \\
					\textbf{Python} \\
					Raspberry Pi \\
				\end{tabular}
			}
			&
			{\small
				\begin{tabular}{@{}l@{}}
					ETL Pipelines \\
					HTTP \\
					JSON \\
					REST APIs \\
					SQL \\
					UART \\
					WiFi \\
				\end{tabular}
			}
			&
			{\small
				\begin{tabular}{@{}l@{}}
					Bash \\
					Celery \\
					Django \\
					Gunicorn \\
					Redis \\
				\end{tabular}
			}
			&
			{\small
				\begin{tabular}{@{}l@{}}
					CI/CD \\
					Docker \\
					\textbf{Git} \\
					Linux \\
					Nginx \\
					\textbf{SSH} \\
					systemd \\
				\end{tabular}
			}
			
		\end{tabularx}


		\vspace{3.5mm}

		\makebox[\textwidth]{%
			\rule[0.5ex]{0.22\textwidth}{0.4pt} \quad
			\textbf{BSc. Mathematics, 2022, Simon Fraser University} \quad
			\rule[0.5ex]{0.23\textwidth}{0.4pt}
		}
	\end{center}



	
	\vspace{-1.25em}
\section*{Work Experience}
	\vspace{-0.65em}
	
	\work
	{Investment Analyst: Data Architecture \& Backend Systems }
	{Vancouver, BC}
	{Aligned Capital Partners / River Wealth}
	{11/2024 - Ongoing}
	{Q: What data exists that might let us predict stock growth and market behaviour?}
	{
		\item Engineered \textbf{data ingestion} workflows across multiple methods (HTTP requests, file-based feeds, web scraping), using stateful retries and validation checks to handle unreliable upstream sources.
		
		\item Fully provisioned and maintained headless \textbf{production Linux infrastructure} from bare-metal deployment through service orchestration (systemd, Nginx, Gunicorn).
		
		\item Built Python-based reporting systems that \textbf{automated data monitoring} workflows, reducing company-wide labour load by 20\% and mitigating potential for human error.
	}
	
	\work
	{Test Technologist}
	{Burnaby, BC}
	{IBC Technologies}
	{6/2022 - 9/2023}
	{Q: How can we safely optimize heat transfer from a boiler's combustion chamber?}
	{
		\item Automated hardware validation processes through IoT ESP32 microcontrollers and PLC systems, streaming test data into \textbf{cloud-connected repositories} for analysis and report generation.
		
		\item Led certification and \textbf{validation of hardware/software systems} for boilers under Canadian and U.S. regulations, triaging issues and coordinating cross-team resolution to enable market release of two products.
		
		\item Built an embedded \textbf{ESP32 control system} for an assembly station lift, adding a laser-based obstruction sensor as a safety override to technician controls, resulting in a 15\% throughput increase.
				
		\item Built high-throughput data analysis workflows in MATLAB for multi-million-point datasets, \textbf{reducing test validation time by 85\%}.
	}
		
	
	
	\work
	{IT Technician (Internship)}
	{Vancouver, BC}
	{BC Cancer Research Centre (\textnormal{BCCRC})}
	{09/2018 - 01/2019}
	{Q: How much digital freedom can we grant researchers without compromising network security?}
	{
		\item Managed user access controls and permissions within a segregated research network, enforcing data isolation and \textbf{cybersecurity} policies across multiple user groups.
		
		\item Managed, diagnosed, and resolved \textbf{TCP/IP}-based network connectivity issues across a segmented domain environment, including endpoint user access and inter-device communication.
		
		\item Assisted in network recovery during facility-wide outage caused by a malware incident, supporting administrators in restoring connectivity and validating \textbf{system integrity} across endpoints.
	}
	
	
	
\noindent\rule{\textwidth}{0.4pt} \vspace{-0.2em}

\section*{Volunteering}
		\vspace{-0.65em}

		\work
		{Automation Technologist}
		{Vancouver, British Columbia}
		{TRIUMF - Canada's Particle Accelerator}
		{05/2025 - Ongoing}
		{Q: What modern technological advances have resolved longstanding engineering problems?}
		{
			\item Contributed \textbf{technical foundations} for 3 scientific publications (in preparation) on EPICS implementation in nuclear physics laboratories.
			
%			\item Delivered a containerized EPICS \textbf{deployment pipeline} using Bash, contributing to a modernization initiative for legacy middleware operating over \$1.5B in local infrastructure.

			\item Delivered a containerized \textbf{EPICS deployment pipeline} using Bash, enabling a reproducible control-system environment intended to support experimental automation workflows for staff and students.

			
			\item Coded a control driver for an undocumented \textbf{stepper motor}, merging hardware wiring, driver design, and Python interface for automated and repeatable experimental control.
		}

	\work
	{Laboratory Assistant}
	{Vancouver, British Columbia}
	{Beaty Biodiversity Museum - Vertebrate Lab}
	{09/2025 - 11/2025}
	{Q: What creature is this?}
	{
		\item Performed necropsies on animal carcasses, gathering tissue samples and recording specimen health data.
		\item Sought information from entomologists and botanists to identify animal stomach contents and improve specimen data depth.
		\item Acted as caretaker to dermestid beetle colonies during their cleaning of skeletons.
	}

	\work
	{Employee Committee: Engineering Representative}  
	{Burnaby, British Columbia}                  
	{IBC Technologies}                             
	{03/2023 – 09/2023}       
	{Q: How can we improve workplace culture?}                   
	{                                            
		\item Planned, purchased for, and implemented a company-wide plant giveaway, which was met with tremendous warmth from staff.
		\item Organized, set up, and facilitated monthly company lunches, feeding over 200 employees.
	}

%	\work
%	{The Peak Publications Society}
%	{Burnaby, British Columbia}
%	{Board of Directors – Collective Representative}
%	{06/2021 – 12/2021}
%	{}
%	{	
%		\item Collaborated with financial advisors to manage a \$1.5 million investment account, finding a balance between ethical values and financial realities.
%		\item Researched, presented, and voted on governance issues, including operating budgets and long-term strategy.
%	}

\noindent\rule{\textwidth}{0.4pt} \vspace{-0.2em}


\section*{Certifications}	
	\vspace{-0.65em}
	
	\certification{Class 5 Driver's License}{03/2026 - 03/2031}{ICBC}
	
	\certification{Nuclear Energy Worker}{09/2025 - 09/2030}{Canadian Nuclear Safety Commission}
	
	
\end{document}
